\chapter*{ABBREVIATIONS}
    \addcontentsline{toc}{chapter}{ABBREVIATIONS}
    \input{include/acronyms}

%
%\begin{tabular}{p{1cm}p{12cm}ll}
%ADC & Analog Digital Converter\\
%CSA & Charge Sensitive Amplifier\\
%FPGA & Field Programmable Gate Array\\
%PCB & Printed Circuit Board (electronic card)\\
%PHA & Pulse Height Analysis\\
%SSD & Solid State Detector\\
%WBS & Work Breakdown Structure\\
%\end{tabular}

% \begin{compactitem}[]
% % \item \textbf{ADC} Analog Digital Converter
% % % \item \textbf{asap} as soon as possible
% % % \item \textbf{ATI} Atominstitut
% % \item \textbf{BEXUS} Balloon Experiments for University Students
% % \item \textbf{BGO} Bismuth Germanium Oxide
% % \item \textbf{CAU} Christian-Albrechts-Universit\"at
% % % \item \textbf{CDR} Critical Design Review
% % \item \textbf{CHAOS} Cherenkov Atmospheric Observation System
% % % \item \textbf{COG} Centre of Gravity
% % % \item \textbf{CRP} Campaign Requirement Plan
% % \item \textbf{CSA} Charge Sensitive Amplifier
% % % \item \textbf{DLR} Deutsches Zentrum f\"ur Luft- und Raumfahrt
% % %\item \textbf{DMA} Direct Memory Access
% % % \item \textbf{DPG} Deutsche Physikalische Gesellschaft
% % % \item \textbf{EAR} Experiment Acceptance Review
% % %\item \textbf{ECT}S European Credit Transfer System
% % % \item \textbf{ESA} European Space Agency
% % \item \textbf{Esrange} European Space and Sounding Rocket Range
% % % \item \textbf{ESTEC} European Space Research and Technology Centre, ESA (NL)
% % \item \textbf{FPGA} Field Programmable Gate Array
% % % \item \textbf{EPP} Expanded Polypropylen
% % % \item \textbf{FEA} Finite Element Analysis
% % % \item \textbf{FST} Flight Simulation Test
% % % \item \textbf{FRP} Flight Requirement Plan
% % \item \textbf{GCRs} Galactic Cosmic Rays
% % \item \textbf{Geant4} Geometry and Tracking
% % \item \textbf{IEAP} Institut f\"ur Experimentelle und Angewandte Physik
% % %\item \textbf{IPR} Interim Progress Review
% % % \item \textbf{LDO} Low-dropout regulator
% % %\item \textbf{LO} Lift Off
% % % \item \textbf{MORABA} Mobile Raketen Basis (DLR, EuroLaunch)
% % %\item \textbf{OSI} Open System Interconnection Model
% % \item \textbf{PMT} Photomultiplier Tube
% % % \item \textbf{PC} Power Consumption
% % \item \textbf{PCB} Printed Circuit Board
% % % \item \textbf{PDR} Preliminary Design Review
% % \item \textbf{PHA} Pulse Height Analysis
% % %\item \textbf{RAD} Radiation Assessment Detector
% % %\item \textbf{RBF} Remove Before Flight
% % \item \textbf{RX/BX} REXUS/BEXUS
% % \item \textbf{SED} Student Experiment Documentation
% % % \item \textbf{SNSA} Swedish National Space Agency
% % %\item \textbf{SODS} Start Of Data Storage
% % %\item \textbf{SOE} Start Of Experiment
% % % \item \textbf{SPI} Serial Peripheral Interface
% % \item \textbf{SSD} Solid State Detector
% % % \item \textbf{T} Time before and after launch noted with + or -
% % %\item \textbf{TBC} To be confirmed
% % %\item \textbf{TBD} To be determined
% % \item \textbf{UDP} User Datagram Protocol
% % \item \textbf{WBS} Work Breakdown Structure
% % \item \textbf{ZARM} Zentrum f\"ur angewandte Raumfahrttechnologie und Mikrogravitation
% % % \item \textbf{ZW} Zentrale Werkstatt im Physikzentrum der CAU
% \end{compactitem}