\chapter{ADDITIONAL TECHNICAL INFORMATION}\label{sec:add_tech_info}
    \change{This chapter includes the first pages of the experimental component's data sheets, as well as some of the relevant electronic schematics and assembly diagrams. The full datasheets and additional information on the electronics can be found on the \ac{RX/BX} team page under \url{https://rexusbexus.zarm.uni-bremen.de/share/page/} in the folder \texttt{CHAOS/Additional Information/}.}

    % \begin{figure}[!h]
    %     \includegraphics[width=1.1\textwidth]{images/datasheets/tsa_aerogel_spec_006_20220524.pdf}
    %     \caption{Specifications of the delivered aerogels (\cite{tabata})}
    % \end{figure}
    % \vfill

 \newpage
    \includepdf[pages={1,4}]{images/datasheets/s3590-08_etc_kpin1052e.pdf}

    \includepdf[pages=-]{images/datasheets/R1924A_P-700_TPMH1387E.pdf}

    \newpage
    \includepdf[pages=-]{images/datasheets/R3550A-600_R3550P-600_TPMH1384E.pdf}

    \newpage
    \includepdf[pages=-]{images/datasheets/HETB-information.pdf}

    \newpage
    \includepdf[pages=-,angle=180]{images/datasheets/HETB-carrier.pdf}

    \newpage
    \includepdf[pages={1,2}]{images/datasheets/ENG_DS_MS5534C_B2.pdf}

    \newpage
    \includepdf[pages={1,2}]{images/datasheets/F001RevF_Hermetic-1.pdf}

    \newpage
    \includepdf[pages=-]{images/datasheets/Datasheet_pressure_housing_2.pdf}

    \newpage
    \includepdf[pages=-,angle=90]{images/datasheets/pressure_housing.pdf}

    

    \newpage
    \includepdf[pages=-,angle=90]{images/datasheets/nm64_power_sch.pdf}
    \includepdf[pages=-,angle=90]{images/datasheets/sepic-ana_sch.pdf}
    \includepdf[pages=-,angle=90]{images/datasheets/sepic-dig_sch.pdf}
    
    \newpage
    \includepdf[pages=-,angle=90]{images/datasheets/HV-Interfaceboard.pdf}

    \newpage
    \includepdf[pages=-,angle=90]{images/datasheets/hvosc_sch.pdf}

    \newpage
    \includepdf[pages={1,6}]{images/datasheets/20240220-chaos-hv-multiplier.document-all.pdf}

    \newpage
    \includepdf[pages=-]{images/datasheets/Siliconschnur_Datenblatt.pdf}

    \includepdf[pages=-,angle=90]{images/technical_drawings/athena-ahepam-2680-dm_bgo-bracket_var1-1.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/athena-ahepam-2687-dm_bgo-frame-a.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/athena-ahepam-2747-dm_bgo-frame-c.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/athena-ahepam-2827-dm_bgo-clamp-block_r01.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/athena-ahepam-2834-dm_chkv-lid-a.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/athena-ahepam-2836-dm_chkv-rear-wall.pdf}

    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-2786-fm_base-plate.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-2787-fm_sh-bracket.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-2826-c1_if-plate.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-2849-fm_lock-bar.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-2850-fm_lock-bar.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-2855-fm_triplet-adapter.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-2856-fm_triplet-adapter-f.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/bexus2024-chaos-fm_triplet-adapter-div.pdf}

    \includepdf[pages=-,angle=90]{images/technical_drawings/etph-ahepam-2828-dm_bgo-horseshoe.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/etph-ahepam-2829-dm_bgo-lock-screw_r01.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/etph-ahepam-2835-dm_chkv-lock-column.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/etph-ahepam-2837-dm_chkv-pmt-column.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/etph-ahepam-2838-dm_chkv-base.pdf}
    \includepdf[pages=-,angle=90]{images/technical_drawings/etph-ahepam-2839-dm_pmt-hv-standoff.pdf}