\begin{acronym}[DMGSER]
    \acro{ADC}{Analog Digital Converter}
    \acro{ADAM}{Angular Distribution of Charged Particles - Atmosphere Measurement}
    \acro{AHEPaM}{ATHENA High Energy Particle Monitor}
    \acro{asap}{as soon as possible}
    \acro{ASCII}{American Standard Code for Information Interchange}
    \acro{ATI}{Atominstitut}
    \acro{BEXUS}{Balloon Experiments for University Students}
    \acro{BGO}{Bismuth Germanium Oxide}
    \acro{CAD}{Computer-aided Design}
    \acro{CAU}{Christian-Albrechts-Universit\"at}
    \acro{CDR}{Critical Design Review}
    \acro{CHAOS}{Cherenkov Atmospheric Observation System}
    \acro{COG}{Centre of Gravity}
    \acro{CRP}{Campaign Requirement Plan}
    \acro{CSA}{Charge Sensitive Amplifier}
    \acro{DAC}{Digital Analog Converter}
    \acro{DLR}{Deutsches Zentrum f\"ur Luft- und Raumfahrt}
    \acro{DMA}{Direct Memory Access}
    \acro{DPG}{Deutsche Physikalische Gesellschaft}
    \acro{EAR}{Experiment Acceptance Review}
    \acro{E-Box}{Electronics Box}
    \acro{ECTS}{European Credit Transfer System}
    \acro{EPP}{Expanded Polypropylen}
    \acro{ESA}{European Space Agency}
    \acro{Esrange}{European Space and Sounding Rocket Range}
    \acro{ESTEC}{European Space Research and Technology Centre, ESA (NL)}
    \acro{FaNS}{Fast Neutron Spectrometer}
    \acro{FCT}{Flight Compatibility Test}
    \acro{FIFO}{First in First Out}
    \acro{FPGA}{Field Programmable Gate Array}
    \acro{FEA}{Finite Element Analysis}
    \acro{FH}{Fachhochschule}
    \acro{FST}{Flight Simulation Test}
    \acro{FRP}{Flight Requirement Plan}
    \acro{GCR}{Galactic Cosmic Ray}
    \acro{GEANT4}{Geometry and Tracking}
    \acro{GNSS}{Global Navigation Satellite System}
    \acro{GP}{Gaussian Process}
    \acro{H}{High}
    \acro{HV}{High Voltage}
    \acro{IEAP}{Institut f\"ur Experimentelle und Angewandte Physik}
    \acro{IRENA}{IRAS Readout Electronics for Nuclear Applications}
    \acro{IPR}{Integration Progress Review}
    \acro{L}{Low}
    \acro{LDO}{Low-dropout regulator}
    \acro{LO}{Lift Off}
    \acro{MIP}{Minimally Ionizing Particle}
    \acro{MORABA}{Mobile Raketen Basis (DLR, EuroLaunch)}
    \acro{OSI}{Open System Interconnection Model}
    \acro{PMT}{Photomultiplier Tube}
    \acro{PC}{Power Consumption}
    \acro{PCB}{Printed Circuit Board}
    \acro{PDR}{Preliminary Design Review}
    \acro{PHA}{Pulse Height Analysis}
    \acro{PIPS}{Passivated Implanted Planar Silicon Detector}
    \acro{POM}{Polyoxymethylene}
    \acro{RAD}{Radiation Assessment Detector}
    \acro{RBF}{Remove Before Flight}
    \acro{RF}{Radio Frequency}
    \acro{RX/BX}{REXUS/BEXUS}
    \acro{SED}{Student Experiment Documentation}
    \acro{SETH}{Scintiallation Event Triggering Hodoscope}
    \acro{SNSA}{Swedish National Space Agency}
    \acro{SODS}{Start Of Data Storage}
    \acro{SOE}{Start Of Experiment}
    \acro{SPI}{Serial Peripheral Interface}
    \acro{SSC}{Swedish Space Corporation}
    \acro{SSD}{Solid State Detector}
    \acro{SSP}{Synchronous Serial Port}
    \acro{T}{Time before and after launch noted with + or -}
    \acro{TANOS}{Thermal Atmospheric Neutron Observation System}
    \acro{TBC}{To be confirmed}
    \acro{TBD}{To be determined}
    \acro{UART}{Universal Asynchronous Receiver Transmitter}
    \acro{UDP}{User Datagram Protocol}
    \acro{USB}{Universal Serial Bus}
    \acro{WBS}{Work Breakdown Structure}
    \acro{WP}{Work Package}
    \acro{ZARM}{Zentrum f\"ur angewandte Raumfahrttechnologie und Mikrogravitation}
    \acro{ZW}{Zentrale Werkstatt im Physikzentrum der CAU}
\end{acronym}