\section{Detector and Telescope Specifications}
\label{sec:specifications}
As described previously in order to limit project cost to a reasonable minimum stock or residual parts have been specified for the \acs{DM}. This chapter shows the detector and telescope specifications of the two statuses and allows for a comparison of the two.

\begin{figure}[h]
	\begin{subfigure}[]{0.5\linewidth}
		\includegraphics[width=\linewidth]{cau-ath-ddc-0006_i1-0/media/cau-ath-icd-0009_i2-0_telescope.pdf}
		\caption[FM telescope]{\centering{\acs{FM} telescope}}
		\label{fig:techdraw-fm-telescope}
	\end{subfigure}
	\hfill
	\begin{subfigure}[]{0.5\linewidth}
		\includegraphics[width=\linewidth]{cau-ath-ddc-0006_i1-0/media/cau-ath-icd-nnnn_i1-0_telescope.pdf}
		\caption[DM telescope]{\centering{\acs{DM} telescope}}
		\label{fig:techdraw-dm-telescope}
	\end{subfigure}
	\caption[Two side by side pages showing the FM and DM telescope]{Details of the FM/ DM telescopes.}
	\label{fig:telescope-specs}
\end{figure}

\begin{figure}[h]
	\begin{subfigure}[]{0.5\linewidth}
		\includegraphics[width=\linewidth]{cau-ath-ddc-0006_i1-0/media/cau-ath-icd-0009_i2-0_detectors.pdf}
		\caption[FM detectors]{\centering{\acs{FM} detectors}}
		\label{fig:techdraw-fm-detectors}
	\end{subfigure}
	\hfill
	\begin{subfigure}[]{0.5\linewidth}
		\includegraphics[width=\linewidth]{cau-ath-ddc-0006_i1-0/media/cau-ath-icd-nnnn_i1-0_detectors.pdf}
		\caption[DM detectors]{\centering{\acs{DM} detectors}}
		\label{fig:techdraw-dm-detectors}
	\end{subfigure}
	\caption[Two side by side pages showing the FM and DM telescope]{Details of the FM/ DM telescopes.}
	\label{fig:detector-specs}
\end{figure}

%\subsection{Specification Tree}
%\begin{figure}[h]
%	\centering
%	\includegraphics[width=0.8\linewidth]{media/ahepam_spec-tree.pdf}
%	\caption[ahepam-dm-spec-tree]{\_\_DRAFT\_\_ AHEPaM Specification Tree \_\_DRAFT\_\_}
%	\label{fig:spec_tree}
%\end{figure}