\documentclass[12pt]{article}
\usepackage{fullpage}
\usepackage[utf8]{inputenc}
\usepackage{graphicx}
\usepackage{hyperref}
\usepackage{xcolor}
\usepackage{subcaption}		
\usepackage{multirow}




\title{AHEPaM DM/FM Design Manifest}

\begin{document}
\section{Overview / Estimation}
\begin{itemize}
    \item structural finalize design, manufacturing - until Feb. 2024 (Lars)
    \item electronic boards finished and populated - until Feb. 2024 (Björn)
    \item assembly - 2 months (assembly is finished by May 2024)
    \item tests - 3 months (?) - have to be planned at least 6 months in advance!
\end{itemize}


%\begin{figure}[h]
%	\centering
%	\includegraphics[width=1\linewidth]{media/athena_schedule_old}
%	\caption[ahepam\_gantt-chart]{AHEPaM Schedule}
%	\label{fig:gantt}
%\end{figure}



\end{document}